Small changes to C API unit tests.

Small changes to C API unit tests.

- (1) Changed randomized math structure values to predefined values to prevent cases that could potentially lead to division by zero.
- (2) Removed unused variable(s) due to (1).
- (3) Renamed variable(s) for better clarity.