Added validation step, added helper macro AI_BUILD_KEY to the material system.

Added validation step, added helper macro AI_BUILD_KEY to the material system.

git-svn-id: https://assimp.svn.sourceforge.net/svnroot/assimp/trunk@59 67173fc5-114c-0410-ac8e-9d2fd5bffc1f